Index: src/chext/chext.def
===================================================================
diff -u -N -r3493e9fc470285b0a0b417d50be281467a071eb7 -r47da0c5883b1bf97972b1bcd3dc70b2d64024969
--- src/chext/chext.def	(.../chext.def)	(revision 3493e9fc470285b0a0b417d50be281467a071eb7)
+++ src/chext/chext.def	(.../chext.def)	(revision 47da0c5883b1bf97972b1bcd3dc70b2d64024969)
@@ -1,4 +1,4 @@
-; CopyHandlerShellExt.def : Declares the module parameters.
+; chext.def : Declares the module parameters.
 
 LIBRARY      "chext.dll"
 
